DROP TABLE config;

CREATE TABLE config (
   config_key varchar(100),
   config_value varchar(200),
   CONSTRAINT config_pk PRIMARY KEY (config_key)
);
INSERT INTO config (config_key, config_value) VALUES ('account.maxFailedLogins', '5');